-- AlterTable
ALTER TABLE "lab_case_tasks" ALTER COLUMN "updatedAt" DROP DEFAULT,
ALTER COLUMN "prosthesisTypeCode" DROP DEFAULT,
ALTER COLUMN "workflowStepCode" DROP DEFAULT;

-- RenameIndex
ALTER INDEX "lab_case_tasks_labCaseId_treatmentDetailId_prosthesisTypeCode_s" RENAME TO "lab_case_tasks_labCaseId_treatmentDetailId_prosthesisTypeCo_key";
